Средства защиты периметра и орудийные платформы «Сабля» (статья)

Материал из Warpopedia

wiki.warpfrog.wtf

На Бете Анфелиона IV части Имперской Гвардии располагали многочисленным и разнообразным вооружением для обеспечения безопасности лабораторий и командных центров. В первую очередь территория перекрывалась сдерживающим ограждением. По всей своей протяженности оно вырабатывает силовое поле огромной мощности, поэтому использование сдерживающего ограждения сопряжено с чудовищными энергозатратами. Но оно того стоит: любое существо, достаточно тупое, чтобы попытаться пройти сквозь поле, попросту испаряется. Но нельзя считать ограждение неуязвимым. Опоры поддерживают периметр, создавая ток энергии, и стоит этому току нарушиться, последует перегрузка, и целая секция отключится.

Сдерживающие ограждения используются только для защиты важных районов. Из-за огромного количества энергии, необходимого для их работы, они встречаются не повсеместно, и устанавливаются только в крайне уязвимых зонах. В отличие от сравнительно небольших стазисных ограждений, сдерживающее ограждение – это капитальное сооружение, которое нельзя просто так собирать-разбирать и переносить с места на место. Его установка может занять месяцы. На Бете Анфелиона IV сдерживающими ограждениями были обнесены зоны содержания тиранидов, а также все лабораторные комплексы на случай побега биоубийц.

У Имперской Гвардии есть также и свои собственные средства защиты периметра: стационарные сканеры, прожекторы и орудийные платформы «Сабля».

Стационарные сканеры дальнего радиуса действия работают по тем же принципам, что и ручные, полагающиеся каждому офицеру и сержанту. Единственные отличия – мощность и размеры. Эти устройства, которыми управляет гвардеец-оператор, устанавливаются на оборонительных позициях и используются для сканирования местности в поисках врагов. Они собирают широчайший спектр данных о перемещениях противника, а затем отправляют собранные сведения по вокс-каналу.

После установки сканер уже нельзя перемещать. Из-за продолжительной калибровки сканер невозможно транспортировать по полю битвы, что ограничивает его применение в динамичном бою, однако делает незаменимым в составе статичной обороны. Сканеры дальнего радиуса действия – продвинутое и сложное оборудование, поэтому нечасто встречаются в Имперской Гвардии, и применяются только для защиты ключевых позиций.

Стационарные прожекторы – это тяжёлые, устанавливаемые на землю лампы, что используются для подсветки целей в темноте. Прожекторы часто придаются расчетам тяжелых орудий для поиска наземных и воздушных целей, но иногда их могут монтировать на технику.

Орудийные платформы «Сабля» представляют собой неподвижные установки с самым разнообразным тяжёлым вооружением. Их используют и как дополнительное средство противовоздушной обороны, и для поражения наземных целей. Орудийные платформы «Сабля» обычно придаются взводам тяжёлого вооружения взамен обычного тяжёлого оружия, но из-за своего веса их развертывают только когда полк занимает долговременные оборонительные позиции. Орудийные платформы «Сабля» также используются Силами Планетарной Обороны.

Опора сдерживающего ограждения модели «Фаэтон»

Генератор модели «Фаэтон»

Платформа «Сабля» с прожектором

Сканеры дальнего радиуса действия

Модель «Аккатран»

Модель «Кантраэль»

Спаренные тяжелые болтеры

Спаренные автопушки

Счетверенные тяжелые стабберы

Спаренные лазпушки

Книга загружена из Warpopedia - Гильдии Переводчиков Warhammer & Warhammer 40,000
wiki.warpfrog.wtf