Башня-сенсор дистанционного наблюдения (статья)

Материал из Warpopedia

wiki.warpfrog.wtf

Еще одним из недавно обнаруженных образцов техники тау является башня-сенсор дистанционного наблюдения. Эти странные устройства не попадались ни одному из подразделений Имперской Гвардии почти до самого окончания кампании на Таросе. Авангард 114-го Кадийского полка заметил эти высокие, тонкие башни, выдвигаясь в направлении гидростанции 23-30. Вскоре после этого кадийские колонны подверглись удару дальнобойных самонаводящихся ракет, потеряв при этом несколько «Химер».

Башня-сенсор дистанционного наблюдения является, по сути, станцией передачи информации, сканирующей окружающую местность и передающей данные о перемещениях вражеских сил подразделениям тау, находящимся поблизости. Она включает в себя чувствительные наземные датчики, собственную систему ППЦ и информацию по целям, используемую для управления огнем других подразделений. Башня не имеет вооружения и считается у тау расходным материалом.

Сама по себе башня выглядит как уменьшенный вариант сторожевой башни-дрона, но вместо вооружения внутри имеет высокую телескопическую антенну, выдвигающуюся вверх для предоставления сенсорному оборудованию более выгодной позиции для сканирования.

Тау использовали башни как средство блокирования района, мешая кадийским «Химерам» двигаться без привлечения немедленной атаки противника. В этом случае они работали больше как обыкновенное минное поле, скорее замедляя и усложняя продвижение противника, чем останавливая самостоятельно. Камуфлированные под пустыню башни малозаметны, и при поддержке быстроходных «Пираний» с самонаводящимися ракетами на борту тау могли совершать налеты на колонны кадийцев, нанося им существенные потери. В результате возникших задержек окруженные на гидростанции элизианские десантники не получили подкреплений, и в конечном итоге их позиции были захвачены.

На данный момент все функции башни-сенсора дистанционного наблюдения неизвестны, поскольку не было захвачено ни одного действующего образца.

Башня-сенсор дистанционного наблюдения – в закрытом положении

ОРДО КСЕНОС

ПРОТОКОЛ ДЕПАРТАМЕНТО АНАЛИТИКУС

Только для внутреннего пользования. Документ предназначен только для служащих Ордо Ксенос. В соответствии с приказом представителя Инквизиции изучение или допущение изучения документа неуполномоченными лицами является преступлением.

Не предназначено для хранения.

Дата: 1508998.M40

Серийный номер: 85673-908461

Разновидность: башня-сенсор

Условное наименование машины: нет

Тип машины: управляемое дроном неподвижное средство обороны

Экипаж: нет

Масса: 2 т

Длина: 2,4 м

Ширина: 2,4 м

Высота: 6,2 м

Максимальная зарегистрированная скорость: нет

Главное орудие: нет

Дополнительные орудия: нет

Угол горизонтального поворота: 360°

Угол снижения и возвышения орудия: нет

Боекомплект: нет

Тип брони: нанокристаллический сплав неизвестного состава

Итоговая оценка: Управляемое дроном неподвижное средство обороны, оснащённое комплексом датчиков и ретранслятором информации о целях.

Башня-сенсор дистанционного наблюдения – в открытом положении и вид в плане

Мысль дня: In Nostra Manus – Progenies Futuris.

Книга загружена из Warpopedia - Гильдии Переводчиков Warhammer & Warhammer 40,000
wiki.warpfrog.wtf